import StartExperience from './common/start-experience.mdx';
import PrepareKeyForFurtherUse from './common/prepare-key-for-further-use.mdx';

# Quick Experience by Chrome Extension

Midscene.js provides a Chrome extension. By using it, you can quickly experience the main features of Midscene on any webpage, without needing to set up a code project.

⁠The extension shares the same code as the npm `@midscene/web` packages, so you can think of it as a playground or a way to debug with Midscene.

![](/midscene-extension.jpg)

## Preparation

<PrepareKeyForFurtherUse />

## Install and config

Install Midscene extension from chrome web store: [Midscene](https://chromewebstore.google.com/detail/midscene/gbldofcpkknbggpkmbdaefngejllnief)

Start the extension (may be folded by Chrome extension icon), setup the config by pasting the config in the K=V format:

```bash
OPENAI_API_KEY="sk-replace-by-your-own"
# ...all other configs here (if any)
```

<StartExperience />

* [Bridge Mode by Chrome Extension](./bridge-mode-by-chrome-extension)
* [Integrate with Puppeteer](./integrate-with-puppeteer)
* [Integrate with Playwright](./integrate-with-playwright)

## FAQ

### Extension fails to run and shows 'Cannot access a chrome-extension:// URL of different extension'

It's mainly due to conflicts with other extensions injecting `<iframe />` or `<script />` into the page. Try disabling the suspicious plugins and refresh. 

To find the suspicious plugins:
 
1. Open the Devtools of the page, find the `<script>` or `<iframe>` with a url like `chrome-extension://{ID-of-the-suspicious-plugin}/...`.
2. Copy the ID from the url, open `chrome://extensions/` , use cmd+f to find the plugin with the same ID, disable it.
3. Refresh the page, try again.
